/*
 Navicat Premium Dump SQL

 Source Server         : 62.234.3.186
 Source Server Type    : MySQL
 Source Server Version : 80037 (8.0.37)
 Source Host           : 62.234.3.186:3306
 Source Schema         : yanzhu_project_cloud

 Target Server Type    : MySQL
 Target Server Version : 80037 (8.0.37)
 File Encoding         : 65001

 Date: 10/04/2026 16:21:07
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_menu
-- ----------------------------
DROP TABLE IF EXISTS `sys_menu`;
CREATE TABLE `sys_menu` (
  `menu_id` bigint NOT NULL AUTO_INCREMENT COMMENT '菜单ID',
  `menu_name` varchar(50) NOT NULL COMMENT '菜单名称',
  `parent_id` bigint DEFAULT '0' COMMENT '父菜单ID',
  `order_num` int DEFAULT '0' COMMENT '显示顺序',
  `path` varchar(200) DEFAULT '' COMMENT '路由地址',
  `component` varchar(255) DEFAULT NULL COMMENT '组件路径',
  `query` varchar(255) DEFAULT NULL COMMENT '路由参数',
  `is_frame` int DEFAULT '1' COMMENT '是否为外链（0是 1否）',
  `is_cache` int DEFAULT '0' COMMENT '是否缓存（0缓存 1不缓存）',
  `menu_type` char(1) DEFAULT '' COMMENT '菜单类型（M目录 C菜单 F按钮）',
  `visible` char(1) DEFAULT '0' COMMENT '菜单状态（0显示 1隐藏）',
  `status` char(1) DEFAULT '0' COMMENT '菜单状态（0正常 1停用）',
  `perms` varchar(100) DEFAULT NULL COMMENT '权限标识',
  `icon` varchar(100) DEFAULT '#' COMMENT '菜单图标',
  `create_by` varchar(64) DEFAULT '' COMMENT '创建者',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) DEFAULT '' COMMENT '更新者',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `remark` varchar(500) DEFAULT '' COMMENT '备注',
  PRIMARY KEY (`menu_id`)
) ENGINE=InnoDB AUTO_INCREMENT=3467 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci COMMENT='菜单权限表';

-- ----------------------------
-- Records of sys_menu
-- ----------------------------
BEGIN;

INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3403, 'LED监控', 5, 65, 'ledRunInfo', 'system/ledscreen/ledRunInfo', NULL, 1, 0, 'C', '0', '0', 'system:ledruninfo:list', 'logininfor', 'yzadmin', '2026-01-04 16:06:47', 'yzadmin', '2026-01-04 16:07:20', '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3404, '安全穿透式管理', 0, 25, 'safe_penetration', NULL, NULL, 1, 0, 'M', '0', '0', '', 'validCode', 'yzadmin', '2026-04-10 14:24:57', 'yzadmin', '2026-04-10 14:25:17', '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3405, '基础信息设置', 3404, 10, 'base_setting', NULL, NULL, 1, 0, 'M', '0', '0', NULL, 'system', 'yzadmin', '2026-04-10 14:26:14', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3406, '管理穿透', 3404, 20, 'mgr_penetration', NULL, NULL, 1, 0, 'M', '0', '0', NULL, 'validCode', 'yzadmin', '2026-04-10 14:27:53', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3407, '网格管理', 3404, 1, 'safePenetrationGrid', 'manage/safePenetrationGrid/index', NULL, 1, 0, 'C', '0', '0', 'manage:safePenetrationGrid:list', '9screen', 'admin', '2026-04-10 14:59:28', 'yzadmin', '2026-04-10 16:16:32', '网格菜单');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3408, '网格查询', 3407, 1, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetrationGrid:query', '#', 'admin', '2026-04-10 14:59:28', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3409, '网格新增', 3407, 2, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetrationGrid:add', '#', 'admin', '2026-04-10 14:59:28', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3410, '网格修改', 3407, 3, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetrationGrid:edit', '#', 'admin', '2026-04-10 14:59:28', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3411, '网格删除', 3407, 4, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetrationGrid:remove', '#', 'admin', '2026-04-10 14:59:29', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3412, '网格导出', 3407, 5, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetrationGrid:export', '#', 'admin', '2026-04-10 14:59:29', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3413, '工点管理', 3405, 1, 'safePenetrationWorkspace', 'manage/safePenetrationWorkspace/index', NULL, 1, 0, 'C', '0', '0', 'manage:safePenetrationWorkspace:list', 'system', 'admin', '2026-04-10 15:00:31', 'yzadmin', '2026-04-10 16:17:20', '工点菜单');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3414, '工点查询', 3413, 1, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetrationWorkspace:query', '#', 'admin', '2026-04-10 15:00:31', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3415, '工点新增', 3413, 2, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetrationWorkspace:add', '#', 'admin', '2026-04-10 15:00:31', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3416, '工点修改', 3413, 3, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetrationWorkspace:edit', '#', 'admin', '2026-04-10 15:00:31', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3417, '工点删除', 3413, 4, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetrationWorkspace:remove', '#', 'admin', '2026-04-10 15:00:31', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3418, '工点导出', 3413, 5, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetrationWorkspace:export', '#', 'admin', '2026-04-10 15:00:31', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3419, '横向检查配置', 3405, 1, 'horizontalCheckCfg', 'manage/safePenetration/horizontalCheckCfg/index', NULL, 1, 0, 'C', '0', '0', 'manage:safePenetration:horizontalCheckCfg:list', 'system', 'admin', '2026-04-10 15:07:50', 'yzadmin', '2026-04-10 16:17:30', '横向检查配置');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3420, '横向检查配置查询', 3419, 1, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:horizontalCheckCfg:query', '#', 'admin', '2026-04-10 15:07:50', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3421, '横向检查配置新增', 3419, 2, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:horizontalCheckCfg:add', '#', 'admin', '2026-04-10 15:07:50', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3422, '横向检查配置修改', 3419, 3, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:horizontalCheckCfg:edit', '#', 'admin', '2026-04-10 15:07:50', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3423, '横向检查配置删除', 3419, 4, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:horizontalCheckCfg:remove', '#', 'admin', '2026-04-10 15:07:50', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3424, '横向检查配置导出', 3419, 5, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:horizontalCheckCfg:export', '#', 'admin', '2026-04-10 15:07:50', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3425, '纵向检查配置', 3405, 1, 'verticalCheckCfg', 'manage/safePenetration/verticalCheckCfg/index', NULL, 1, 0, 'C', '0', '0', 'manage:safePenetration:verticalCheckCfg:list', 'system', 'admin', '2026-04-10 15:14:37', 'yzadmin', '2026-04-10 16:17:37', '纵向检查配置');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3426, '纵向检查配置查询', 3425, 1, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:verticalCheckCfg:query', '#', 'admin', '2026-04-10 15:14:37', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3427, '纵向检查配置新增', 3425, 2, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:verticalCheckCfg:add', '#', 'admin', '2026-04-10 15:14:37', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3428, '纵向检查配置修改', 3425, 3, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:verticalCheckCfg:edit', '#', 'admin', '2026-04-10 15:14:37', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3429, '纵向检查配置删除', 3425, 4, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:verticalCheckCfg:remove', '#', 'admin', '2026-04-10 15:14:37', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3430, '纵向检查配置导出', 3425, 5, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:verticalCheckCfg:export', '#', 'admin', '2026-04-10 15:14:37', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3431, '跟班作业配置', 3405, 1, 'followUpAssignmentCfg', 'manage/safePenetration/followUpAssignmentCfg/index', NULL, 1, 0, 'C', '0', '0', 'manage:safePenetration:followUpAssignmentCfg:list', 'system', 'admin', '2026-04-10 15:18:34', 'yzadmin', '2026-04-10 16:17:52', '跟班作业配置');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3432, '跟班作业配置查询', 3431, 1, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:followUpAssignmentCfg:query', '#', 'admin', '2026-04-10 15:18:34', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3433, '跟班作业配置新增', 3431, 2, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:followUpAssignmentCfg:add', '#', 'admin', '2026-04-10 15:18:34', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3434, '跟班作业配置修改', 3431, 3, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:followUpAssignmentCfg:edit', '#', 'admin', '2026-04-10 15:18:34', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3435, '跟班作业配置删除', 3431, 4, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:followUpAssignmentCfg:remove', '#', 'admin', '2026-04-10 15:18:34', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3436, '跟班作业配置导出', 3431, 5, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:followUpAssignmentCfg:export', '#', 'admin', '2026-04-10 15:18:34', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3437, '横向监督表', 3406, 1, 'horizontalCheck', 'manage/safePenetration/horizontalCheck/index', NULL, 1, 0, 'C', '0', '0', 'manage:safePenetration:horizontalCheck:list', 'table', 'admin', '2026-04-10 15:32:13', 'yzadmin', '2026-04-10 16:18:01', '横向监督表');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3438, '横向监督表查询', 3437, 1, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:horizontalCheck:query', '#', 'admin', '2026-04-10 15:32:13', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3439, '横向监督表新增', 3437, 2, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:horizontalCheck:add', '#', 'admin', '2026-04-10 15:32:13', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3440, '横向监督表修改', 3437, 3, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:horizontalCheck:edit', '#', 'admin', '2026-04-10 15:32:13', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3441, '横向监督表删除', 3437, 4, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:horizontalCheck:remove', '#', 'admin', '2026-04-10 15:32:13', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3442, '横向监督表导出', 3437, 5, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:horizontalCheck:export', '#', 'admin', '2026-04-10 15:32:13', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3443, '班前安全检查', 3406, 1, 'beforeSafeCheck', 'manage/safePenetration/beforeSafeCheck/index', NULL, 1, 0, 'C', '0', '0', 'manage:safePenetration:beforeSafeCheck:list', 'table', 'admin', '2026-04-10 16:04:50', 'yzadmin', '2026-04-10 16:18:06', '班前安全检查');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3444, '班前安全检查查询', 3443, 1, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:beforeSafeCheck:query', '#', 'admin', '2026-04-10 16:04:50', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3445, '班前安全检查新增', 3443, 2, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:beforeSafeCheck:add', '#', 'admin', '2026-04-10 16:04:50', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3446, '班前安全检查修改', 3443, 3, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:beforeSafeCheck:edit', '#', 'admin', '2026-04-10 16:04:51', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3447, '班前安全检查删除', 3443, 4, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:beforeSafeCheck:remove', '#', 'admin', '2026-04-10 16:04:51', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3448, '班前安全检查导出', 3443, 5, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:beforeSafeCheck:export', '#', 'admin', '2026-04-10 16:04:51', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3449, '班后安全条件确认', 3406, 1, 'afterSafeConfirm', 'manage/safePenetration/afterSafeConfirm/index', NULL, 1, 0, 'C', '0', '0', 'manage:safePenetration:afterSafeConfirm:list', 'table', 'admin', '2026-04-10 16:08:44', 'yzadmin', '2026-04-10 16:18:18', '班后安全确认');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3450, '班后安全条件确认查询', 3449, 1, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:afterSafeConfirm:query', '#', 'admin', '2026-04-10 16:08:44', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3451, '班后安全条件确认新增', 3449, 2, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:afterSafeConfirm:add', '#', 'admin', '2026-04-10 16:08:44', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3452, '班后安全条件确认修改', 3449, 3, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:afterSafeConfirm:edit', '#', 'admin', '2026-04-10 16:08:44', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3453, '班后安全条件确认删除', 3449, 4, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:afterSafeConfirm:remove', '#', 'admin', '2026-04-10 16:08:44', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3454, '班后安全条件确认导出', 3449, 5, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:afterSafeConfirm:export', '#', 'admin', '2026-04-10 16:08:44', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3455, '关键施工条件确认', 3406, 1, 'keyConstruction', 'manage/safePenetration/keyConstruction/index', NULL, 1, 0, 'C', '0', '0', 'manage:safePenetration:keyConstruction:list', 'table', 'admin', '2026-04-10 16:13:12', 'yzadmin', '2026-04-10 16:18:23', '关键施工条件确认');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3456, '关键施工条件确认查询', 3455, 1, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:keyConstruction:query', '#', 'admin', '2026-04-10 16:13:12', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3457, '关键施工条件确认新增', 3455, 2, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:keyConstruction:add', '#', 'admin', '2026-04-10 16:13:12', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3458, '关键施工条件确认修改', 3455, 3, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:keyConstruction:edit', '#', 'admin', '2026-04-10 16:13:12', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3459, '关键施工条件确认删除', 3455, 4, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:keyConstruction:remove', '#', 'admin', '2026-04-10 16:13:12', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3460, '关键施工条件确认导出', 3455, 5, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:keyConstruction:export', '#', 'admin', '2026-04-10 16:13:12', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3461, '跟班作业记录', 3406, 1, 'followUpAssignment', 'manage/safePenetration/followUpAssignment/index', NULL, 1, 0, 'C', '0', '0', 'manage:safePenetration:followUpAssignment:list', 'table', 'admin', '2026-04-10 16:15:35', 'yzadmin', '2026-04-10 16:18:27', '跟班作业记录');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3462, '跟班作业记录查询', 3461, 1, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:followUpAssignment:query', '#', 'admin', '2026-04-10 16:15:35', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3463, '跟班作业记录新增', 3461, 2, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:followUpAssignment:add', '#', 'admin', '2026-04-10 16:15:35', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3464, '跟班作业记录修改', 3461, 3, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:followUpAssignment:edit', '#', 'admin', '2026-04-10 16:15:36', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3465, '跟班作业记录删除', 3461, 4, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:followUpAssignment:remove', '#', 'admin', '2026-04-10 16:15:36', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (3466, '跟班作业记录导出', 3461, 5, '#', '', NULL, 1, 0, 'F', '0', '0', 'manage:safePenetration:followUpAssignment:export', '#', 'admin', '2026-04-10 16:15:36', '', NULL, '');
COMMIT;

SET FOREIGN_KEY_CHECKS = 1;
