<template>
  <div class="project-standard-curing-room">
    <el-row>
      <el-col :span="6">
        <module-one-1-1 label="质量目标"></module-one-1-1>
        <module-one-2-1 label="过程管控"></module-one-2-1>
      </el-col>
      <el-col :span="12">
        <module-one-1-2 label="当前监测值">
        </module-one-1-2>
        <module-one-1-2 label="温度趋势">
        </module-one-1-2>
        <module-one-1-2 label="湿度趋势">          
        </module-one-1-2>
      </el-col>
      <el-col :span="6">
      </el-col>
    </el-row>
  </div>
</template>

<script>
export default {
  //标养室检测
  name: 'JhbigscreenStandardCuringRoom',

  data() {
    return {

    };
  },

  mounted() {

  },

  methods: {

  },
};
</script>
<style lang="less">
.project-standard-curing-room {}
</style>