<template>
    <div>
      <!-- -->
    </div>
  </template>
  
  <script>
  export default {
    //标养室检测
    name: 'JhbigscreenTowerCrane',
  
    data() {
      return {
        
      };
    },
  
    mounted() {
      
    },
  
    methods: {
      
    },
  };
  </script>