<template>
  <div class="project-distribution-box">
    <el-row>
      <el-col :span="18">
        <module-one-1-3 label="配电箱监测">

        </module-one-1-3>
        <module-one-1-3 label="温度监控">

        </module-one-1-3>
        <module-one-1-3 label="电流监控">

        </module-one-1-3>
      </el-col>
      <el-col :span="6">
      </el-col>

    </el-row>
  </div>
</template>

<script>
import '@/components/module/module-one-1-3'
export default {
  //配电箱
  name: 'JhbigscreenDistributionBox',

  data() {
    return {

    };
  },

  mounted() {

  },

  methods: {

  },
};
</script>
<style lang="less">
.project-distribution-box {}
</style>